Live matter & type safety

Fixed Sizes
Live matter & type safety: Allow 10mm from trim and 15mm from bleed
Double gutter image: it is the file creator’s responsibility to include double image allowance, if required. Neither Rolling Stone nor The Brag Media nor our printer will apply a double gutter image. As a recommendation only: no type should appear within 15mm either side of the gutter on a spread. If other important elements run through the gutter on a spread or middle of the spread should have duplication of 6mm contained within the trim areas.

Left Hand Page
Trim:	W 230mm x H 278mm
Bleed:	W 240mm x H 288mm
5mm all around
Type:	W 205mm x H 258mm
15mm from gutter

DELETE THIS  LAYER

GUTTER