Live matter & type safety

Premium
Live matter & type safety: Allow 10mm from trim and 15mm from bleed

Front Cover Special
Trim:	W 230mm x H 278mm
Bleed:	W 240mm x H 288mm
5mm all around
Type:	W 210mm x H 258mm

DELETE THIS  LAYER