Live matter & type safety

Premium
Live matter & type safety: Allow 10mm from trim and 15mm from bleed

Front Cover Special
Trim:	W 245mm x H 297mm
Bleed:	W 255mm x H 307mm
5mm all around
Type:	W 225mm x H 277mm

DELETE THIS  LAYER