Live matter & type safety

Poster FRONT

Live matter & type safety: Allow 10mm from trim and 15mm from bleed
Perforation on gutter: it is the file creator’s responsibility to include double image allowance, if required. As a recommendation only: no type should appear within 25mm of the gutter, 13mm from the gutter will be a perforation line.

Poster Front
Trim:	W 467mm x H 584mm
Bleed:	W 477mm x H 594mm
5mm all around
Type:	W 432mm x H 564mm
25mm from gutter
13mm from gutter is a peforation line

PERFORATION LINE

DELETE THIS  LAYER

FOLD LINE